−7.0

−6.5

−6.0

−5.5

−5.0

−4.5

0 1 2 3 4 5 6 7 8 9 10

. . . . . . . . ... ... ......

............

.....................................................................

..............................................................................................................................................................................................................................................................................................................................

. . . . . . . . . . ... .. ......

.......

.................

.....................................

................................................................

............................................................................................................ ...................................................

t /ms log i

............................................... 150mV pulse

.................................. 300mV pulse